θ cos 0 0.2 0.4 0.6 0.8 1

Efficiency

0.9 0.92

0.94

0.96

0.98 1 (p>1GeV and NHits>3) θ TPC Tracking Efficiency vs Cos

TPC + Si detectors TPC only

p>1 GeV

θ